                        Line Draw Mode Function Menu


         When the line draw mode is enabled by pressing function key F10,
     a "crosshair" cursor will appear in the upper right portion of the
     screen. In this mode, the following key assignments are in effect:


         Right Arrow...Move cursor right
          Left Arrow...Move cursor left
            Up Arrow...Move cursor up
          Down Arrow...Move cursor down
                   E...Erase line
                   F...Cursor fast
                   G...Move cursor to user specified price
                   M...Mark line end point
                   P...Print price and date marked by cursor
                   S...Cursor slow
                  F6...Redraw plot
                 DEL...Delete last line drawn
                 F10...Exit line draw mode
